ADC 0 500 1000 1500 2000 2500

1

10

10^2

hcosm Nent = 19406 Mean = 86.16 RMS = 83.43

hcosm

ADC 0 500 1000 1500 2000 2500

1

10 hplane0 Nent = 3747 Mean = 143.8 RMS = 171.7

hplane0

ADC 0 500 1000 1500 2000 2500

1

10 hplane1 Nent = 873 Mean = 200.2 RMS = 290.5

hplane1