ADC 100 200 300 400 500 600 700 800 900 1000 0 5 10 15 20 25 30 35 40 45 cosm_2 Nent = 4031 Mean = 120.6 RMS = 104.2

histo

cosm_2

ADC 100 200 300 400 500 600 700 800 900 1000 0 5 10 15 20 25 30 35 cosm_3 Nent = 3734 Mean = 136.2 RMS = 120.8

histo

ADC 100 200 300 400 500 600 700 800 900 1000 0 5 10 15 20 25 30 35 40 45 cosm_4 Nent = 3682 Mean = 112.5 RMS = 108.8

histo

ADC 100 200 300 400 500 600 700 800 900 1000 0 5 10 15 20 25 30 35 40 cosm_5 Nent = 3466 Mean = 121.5 RMS = 101.3

histo

cosm_5

ADC 100 200 300 400 500 600 700 800 900 1000 0 5 10 15 20 25 30 35 40 cosm_6 Nent = 4762 Mean = 139.4 RMS = 118.2

histo

ADC 100 200 300 400 500 600 700 800 900 1000 0 5 10 15 20 25 30 35 40 cosm_7 Nent = 6264 Mean = 125.1 RMS = 105.7

histo

ADC 100 200 300 400 500 600 700 800 900 1000 0 5 10 15 20 25 30 35 40 cosm_8 Nent = 4208 Mean = 131.6 RMS = 105.5

histo

ADC 100 200 300 400 500 600 700 800 900 1000 0 5 10 15 20 25 30 35 40 45 cosm_9 Nent = 4179 Mean = 138.3 RMS = 122.2

histo

cosm_9

ADC 100 200 300 400 500 600 700 800 900 1000 0 5 10 15 20 25 30 35 cosm_10 Nent = 4376 Mean = 152.7 RMS = 124.6

histo

ADC 100 200 300 400 500 600 700 800 900 1000 0 5 10 15 20 25 30 35 40 45 cosm_11 Nent = 4612 Mean = 129.6 RMS = 114.8

histo

cosm_11

ADC 100 200 300 400 500 600 700 800 900 1000 0 5 10 15 20 25 30 35 cosm_12 Nent = 3742 Mean = 139.3 RMS = 117.7

histo

ADC 100 200 300 400 500 600 700 800 900 1000 0

10

20

30

40 50 cosm_13 Nent = 5647 Mean = 131.1 RMS = 106.6

histo

cosm_13

ADC 100 200 300 400 500 600 700 800 900 1000 0

5

10

15

20

25

30 cosm_14 Nent = 3726 Mean = 161.1 RMS = 131.1

histo

ADC 100 200 300 400 500 600 700 800 900 1000 0 5 10 15 20 25 30 35 40 45 cosm_15 Nent = 3400 Mean = 116.2 RMS = 107.4

histo

cosm_15

ADC 100 200 300 400 500 600 700 800 900 1000 0 5 10 15 20 25 30 35 cosm_16 Nent = 4059 Mean = 131.3 RMS = 109.3

histo

ADC 100 200 300 400 500 600 700 800 900 1000 0

10

20

30

40 50 cosm_17 Nent = 4455 Mean = 109.6 RMS = 92.49

histo

cosm_17