ADC 100 200 300 400 500 600 700 800 900 1000 0

2

4

6

8 10 cosm_2 Nent = 705 Mean = 163.9 RMS = 175.1

histo

cosm_2

ADC 100 200 300 400 500 600 700 800 900 1000 0

2

4

6

8

10 12 cosm_3 Nent = 772 Mean = 166.1 RMS = 180.8

histo

cosm_3

ADC 100 200 300 400 500 600 700 800 900 1000 0

2

4

6

8

10 cosm_4 Nent = 615 Mean = 184.5 RMS = 200.3

histo

ADC 100 200 300 400 500 600 700 800 900 1000 0

2

4

6

8

10 cosm_5 Nent = 708 Mean = 158.1 RMS = 189.4

histo

ADC 100 200 300 400 500 600 700 800 900 1000 0

2

4

6

8 10 cosm_6 Nent = 655 Mean = 180.2 RMS = 191.1

histo

cosm_6

ADC 100 200 300 400 500 600 700 800 900 1000 0 2 4 6 8 10 12 cosm_7 Nent = 706 Mean = 153.1 RMS = 175.7

histo

ADC 100 200 300 400 500 600 700 800 900 1000 0

2

4

6

8 10 cosm_8 Nent = 646 Mean = 179.6 RMS = 191.7

histo

cosm_8

ADC 100 200 300 400 500 600 700 800 900 1000 0

2

4

6

8 10 cosm_9 Nent = 752 Mean = 181.9 RMS = 193.4

histo

cosm_9

ADC 100 200 300 400 500 600 700 800 900 1000 0

2

4

6

8

10 12 cosm_10 Nent = 688 Mean = 170.8 RMS = 182

histo

cosm_10

ADC 100 200 300 400 500 600 700 800 900 1000 0 1 2 3 4 5 6 7 8 9 cosm_11 Nent = 646 Mean = 187.8 RMS = 211.3

histo

cosm_11

ADC 100 200 300 400 500 600 700 800 900 1000 0

2

4

6

8

10 cosm_12 Nent = 656 Mean = 164.8 RMS = 190.2

histo

ADC 100 200 300 400 500 600 700 800 900 1000 0 1 2 3 4 5 6 7 8 9 cosm_13 Nent = 748 Mean = 164.3 RMS = 173.5

histo

cosm_13

ADC 100 200 300 400 500 600 700 800 900 1000 0

2

4

6

8

10 12 cosm_14 Nent = 790 Mean = 171.4 RMS = 190.3

histo

cosm_14

ADC 100 200 300 400 500 600 700 800 900 1000 0 1 2 3 4 5 6 7 8 9 cosm_15 Nent = 602 Mean = 170.9 RMS = 191.7

histo

cosm_15

ADC 100 200 300 400 500 600 700 800 900 1000 0 1 2 3 4 5 6 7 8 9 cosm_16 Nent = 583 Mean = 176.6 RMS = 192.6

histo

cosm_16

ADC 100 200 300 400 500 600 700 800 900 1000 0 2 4 6 8 10 12 14 cosm_17 Nent = 685 Mean = 149.4 RMS = 168.3

histo

cosm_17