ADC 0 500 1000 1500 2000 2500

1

10 h_2 Nent = 705 Mean = 186.2 RMS = 268.6

histo

ADC 0 500 1000 1500 2000 2500

1

10 h_3 Nent = 772 Mean = 195.2 RMS = 292.8

histo

ADC 0 500 1000 1500 2000 2500

1

10 h_4 Nent = 615 Mean = 207.1 RMS = 291.7

histo

ADC 0 500 1000 1500 2000 2500

1

10 h_5 Nent = 708 Mean = 166.9 RMS = 255.6

histo

ADC 0 500 1000 1500 2000 2500

1

10 h_6 Nent = 655 Mean = 265.3 RMS = 406.2

histo

ADC 0 500 1000 1500 2000 2500

1

10 h_7 Nent = 706 Mean = 159.5 RMS = 243.9

histo

ADC 0 500 1000 1500 2000 2500

1

10 h_8 Nent = 646 Mean = 203.6 RMS = 292.9

histo

ADC 0 500 1000 1500 2000 2500

1

10 h_9 Nent = 752 Mean = 210 RMS = 302.2

histo

ADC 0 500 1000 1500 2000 2500

1

10 h_10 Nent = 688 Mean = 218.1 RMS = 320.2

histo

ADC 0 500 1000 1500 2000 2500

1

10 h_11 Nent = 646 Mean = 224.1 RMS = 321.8

histo

ADC 0 500 1000 1500 2000 2500

1

10 h_12 Nent = 656 Mean = 186 RMS = 291.9

histo

ADC 0 500 1000 1500 2000 2500

1

10 h_13 Nent = 748 Mean = 193.2 RMS = 292.4

histo

ADC 0 500 1000 1500 2000 2500

1

10 h_14 Nent = 790 Mean = 227.9 RMS = 364.8

histo

ADC 0 500 1000 1500 2000 2500

1

10 h_15 Nent = 602 Mean = 216.8 RMS = 322.1

histo

ADC 0 500 1000 1500 2000 2500

1

10 h_16 Nent = 583 Mean = 219.9 RMS = 332.8

histo

ADC 0 500 1000 1500 2000 2500

1

10 h_17 Nent = 685 Mean = 162.1 RMS = 241.3

histo