Diffractive, Edge gap bigger than 3

Diffractive, Central gap bigger than 3

Diffractive, All gaps bigger than 3 10^{−4}

10^{−3}

10^{−2}

10^{−1}1Mass of the Diffractive System dσ/dM [pb/GeV^{−1}]0100020003000400050006000700005101520

M [GeV]