MC (SD)

MC (DD)

MC (SDDD)

MC (MinBias) 10^{−7} 10^{−6}

10^{−5}

10^{−4}

10^{−3}

10^{−2}Mass of the Diffractive System dσ/dM_D [pb/GeV]010002000300040005000600070000.60.811.21.4

M_D [GeV]

MC/data