MC (P6SECONDLRGedgeSingleDiff200MeV)

MC (P6SECONDLRGedgeMinBias200MeV)

MC (SECONDLRGedgeSingleDiff200MeV)

MC (SECONDLRGedgeMinBias200MeV) 110^110^2Large Rapidity Gap dσ/dΔη [pb]0246810120.60.811.21.4Δη

MC/data