MC (P6SECONDLRGedgeSingleDiff200MeV)

MC (P6SECONDLRGedgeMinBias200MeV)

MC (SECONDLRGedgeSingleDiff200MeV)

MC (SECONDLRGedgeMinBias200MeV) 110^110^2Energy flow as a function of rapidity

1/N, dE/dη [GeV]-4-20240.60.811.21.4η

MC/data