MC (SECONDLRGedgeSingleDiff200MeVGapCut3)

MC (SECONDLRGedgeDoubleDiff200MeVGapCut3)

MC (SECONDLRGedgeDiff200MeVGapCut3) 10^{−6}

10^{−5}

10^{−4}

10^{−3}

10^{−2}Mass of the Diffractive System dσ/dM [pb/GeV^{−1}]010002000300040005000600070000.60.811.21.4

M [GeV]

MC/data