MC (Pythia8-MinBias)

MC (PythiaD6T)

MC (PythiaDW)

MC (PythiaP0)

MC (PythiaProQ20) 110^110^2Minus Side - Total Transverse Energy Deposition (Eplus = 0) dN/dE_T010203040506070800.60.811.21.4 ∑ E−5.2<η<−2.9

MC/data