Diffractive, no N_{ch} cut

Diffractive, N_{ch} > 1

Diffractive, N_{ch} > 2

Diffractive, N_{ch} > 3

Non Diffractive 10^{−5}

10^{−4}

10^{−3}

10^{−2}Mass of the Diffractive System dσ/dM [pb/GeV^{−1}]01000200030004000500060007000-0.500.511.52

M [GeV]