Double Diffractive, central gaps, no pT cut

Diffractive, central gaps, no pT cut

MinBias, central gaps, no pT cut

Non Diffractive, central gaps, no pT cut 110^110^2Energy flow as a function of rapidity

1/N, dE/dη [GeV]-4-2024012345η