Double Diffractive, central gaps, no pT cut

Diffractive, central gaps, no pT cut

MinBias, central gaps, no pT cut

Non Diffractive, central gaps, no pT cut 10^{−2}

10^{−1}1Plus Side - Total Transverse Energy Deposition

1/N, dN/dE_T [GeV^{−1}]0510152025303540012345 ∑ E^{plus}_T [GeV]