realϕfitted ϕ -0.03 -0.02 -0.01 0 0.01 0.02 0.03 entries

0 20 40 60 80 100 120 140

Layer 1 Nent = 1001 Mean = 0.0003515 RMS = 0.00801 Chi2 / ndf = 8.695 / 15 5.792 ± Constant = 148 0.0002575 ± Mean = 0.0004262 0.0001868 ± Sigma = 0.008037

± ± ±