realϕfitted ϕ -0.03 -0.02 -0.01 0 0.01 0.02 0.03 entries

0 20 40 60 80 100 120 140 Layer 5 Nent = 1001 Mean = 2.72e-05 RMS = 0.009057 Chi2 / ndf = 17.26 / 15 5.134 ± Constant = 130.2 0.0002966 ± Mean = -6.169e-05 0.0002153 ± Sigma = 0.009048

± ± ±