Pσ^{reconstr} -P true P -30 -20 -10 0 10 20 30 40 entries

0 20 40 60 80 100 120 140

MOM_HISTO_0.001 Nent = 1001 Mean = 1.473 RMS = 10.07 Chi2 / ndf = 55.11 / 14 6.021 ± Constant = 145.7 0.3478 ± Mean = 1.451 0.2153 ± Sigma = 8.964 ± ± ±

Pσ^{reconstr} -P true P -6 -4 -2 0 2 4 6 8 entries

0 20 40 60 80 100 120 140 160 MOM_HISTO_0.005 Nent = 1001 Mean = 0.2411 RMS = 2.105 Chi2 / ndf = 63.82 / 14 6.383 ± Constant = 153 0.07471 ± Mean = 0.2247 0.05292 ± Sigma = 1.968 ± ± ±

Pσ^{reconstr} -P true P -0.6 -0.4 -0.2 -0 0.2 0.4 0.6 0.8 entries

0 20 40 60 80 100 120 140 160 MOM_HISTO_0.05 Nent = 1001 Mean = 0.02265 RMS = 0.2103 Chi2 / ndf = 60.67 / 14 6.362 ± Constant = 153.8 0.007322 ± Mean = 0.02094 0.005161 ± Sigma = 0.1961

± ± ±