Pσ^{reconstr} -P true P -0.15 -0.1 -0.05 -0 0.05 0.1 0.15 0.2 entries

0 20 40 60 80 100 120 140 160 MOM_HISTO_0.2 Nent = 1001 Mean = 0.005987 RMS = 0.0525 Chi2 / ndf = 88.77 / 15 6.332 ± Constant = 151.1 0.001995 ± Mean = 0.005707 0.001195 ± Sigma = 0.04589

± ± ±

Pσ^{reconstr} -P true P -0.06 -0.04 -0.02 0 0.02 0.04 0.06 0.08 entries

0 20 40 60 80 100 120 140 160 MOM_HISTO_0.5 Nent = 1001 Mean = 0.002644 RMS = 0.02156 Chi2 / ndf = 90.35 / 15 6.598 ± Constant = 153.6 0.0008546 ± Mean = 0.002597 0.0005213 ± Sigma = 0.01894

± ± ±