Pσ^{reconstr} -P true P -2 -1 0 1 2 3 4 entries

0 20 40 60 80 100 120 140 ERROR 0.O1 Nent = 1001 Mean = 0.1163 RMS = 1.045 Chi2 / ndf = 80.85 / 17 5.417 ± Constant = 131.2 0.03836 ± Mean = 0.1089 0.02364 ± Sigma = 0.9385 ± ± ±