ϕσ^{reconstr} ϕ- trueϕ

-4 -3 -2 -1 0 1 2 3 4 entries

0 20 40 60 80 100 120 140 160 ERROR 0.01 Nent = 1001 Mean = 0.01047 RMS = 1.022 Chi2 / ndf = 15.01 / 14 6.024 ± Constant = 153.5 0.03288 ± Mean = 0.01391 0.02381 ± Sigma = 1.026 ± ± ±