tape spacer 0.7 6 tapes 1.38 fibres 0.9

6.0 6.0

2.03.0 transparent

plastic 0.5

70.0 3.0

2.0

2.0

2.0

4.0

VELCRO

VELCRO

TAPE width 21.0 18 FIBRES width 16.2

LMT guide

hinge

fibre guide fibre guide 1.0

TEMPORARY HARNESS CLIP IN CLOSED POSITION mag x 2

TEMPORARY HARNESS CLIP IN OPEN POSiTION

FIBRES

LOW MASS TAPES tape spacer

VELCRO fibre and tape guide - fixed for all fibre sets - bonded to - or part of upper surface of clip fibre guide - hinged plastic clip width increases for fewer fibres - bonded to - or part of upper surface of clip

thickness increases for fewer tapes - bonded to - or part of lower surface of clip

4.0 1.5 3.0

25.0