RTD

cable bunches enclosed in zipper tube - 5 combo cables in each barrel set, 4 combo cables in each wheel set, 44 bunches total. In addition: Radiation monitor cables (red) and sensors (black)

fibres C5

cable support will hold cables in RTD space after C5 is installed