36

5 5 5 8 8

50 ATLAS SCT BARREL HARNESS CLAMP

UCL-DH003a

(6 per harness)

TJF version 27.04.01 d e

(see also UCL-DH003b)

f (NB: a fibre gap in this section

may be necessary - depends on fibre routing)

25 25

24

5 10.5

dogleg centre line tape centre line

5 7.5

18

18 10.5

7.5

Part of clamp which fits under the pad ’hook’

tape