module physics centre position in Z

16.0

22.0

bracket centre line

(21.5)

(dogleg centre line)

(39.548) 40.048

0.2 3.073

44.321 1.0 60.321

7.0

high parts of connector

36.958

LMT edge (longest)

high parts of connector

LMT edge (longest)

(39.548) 39.048

0.2 3.073

43.321 1.0 27.321

7.0

21.5

21.0

35.984

PCB 16.5

PCB 16.5

gap dogleg edge to PCB PCB edge to solder pad

pad edge to end of LMT

LH

RH

gap PCB to dogleg edge solder pad to PCB edge

end of LMT to pad edge

DIMENSIONS dogleg to interface PCB to LMT end wrt BRACKET CENTRE line and LMT end wrt module physics centre TJF 22.07.02