HORIZONTAL INTERLINK

6 exhaust pipes

6 exhaust pipes

5 exhaust pipes

4 capillaries

5 exhaust pipes

AREA COVERED BY QUADRANT MODEL

HORIZONTAL INTERLINK

EXHAUST CAPILLARY

DISTRIBUTION

ATLAS SCT BARREL END with +Z and -Z ends version 3 24 October 2000 T.J.Fraser UCL +Z -Z +Z Thermal enclosure bulkhead for exhaust pipe connections with sealed grommet for capillary pipes through thermal encl. at either side

6 capillaries

6 capillaries 6 capillaries

6 capillaries

4 capillaries

6 capillaries 6 capillaries