barrel circumferential ducts barrel end duct up to thermal enclosure duct outside thermal enclosure out to PPB1 6

5

4 thermal enclosur e

12 single tubed fibres 6 single tubed fibres from end dogleg splice splice 12 single bare fibres 6 single bare fibres before splice

12 way fibre ribbon 6 way fibre ribbon from splice to PPB1

ATLAS SCT BARREL READOUT FIBRE ROUTE LAYOUT

FIBRE BEND

FIBRE BEND

FIBRE BEND

PPB1