Z 800

180 R1097

Z 955

53

R1123

Z 816

12 34 cover

12 34 cover

Z 868

Z 775 around cryostat wall: 11 stacks of 4 + cover

52

76

44 (22 12way, 22 6way) fibre connector MT housings: 4.5 x 9.4 x 25.7 cover: 3.0 x 9.4 x 25.7 barrel services envelope at PPB1

R1133

R1109

TJF 16.10.01 udated 07.03.02 15.03.02

Z 900

Z 1000

Z 1100

Z 1200

Z 1300

Z 1400

Z 1500

Z 1140

Z 1160

Z 880 21 12

21

Z 1440 clip

Z 1320 connector area

connector area cable with outer isolation removed

Z 1295

cable with outer isolation removed clip

Z 1020

Z 995

R1150

14 low mass tape connector low mass tape connector conventional cable

low mass tapes

bare springs will be used instead of the housings described here.

Z 1180